From d0d9215bbb3c5b56d682abffb5abb916ff9d4387 Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Wed, 8 Apr 2020 13:31:31 -0500
Subject: Fix documentation error

Using SCSS tokens in single file components results in a compile issue
causing the documentation to white screen. Moving custom alert styles
to the global alert .scss file to resolve this issue and to keep all
alert styles in one place.

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: I047fa15c76cdfb842e5c00eea99e529595b94632
---
 src/components/Global/Alert.vue | 7 -------
 1 file changed, 7 deletions(-)

(limited to 'src/components/Global/Alert.vue')

diff --git a/src/components/Global/Alert.vue b/src/components/Global/Alert.vue
index d59b25ca..d31d673d 100644
--- a/src/components/Global/Alert.vue
+++ b/src/components/Global/Alert.vue
@@ -32,10 +32,3 @@ export default {
   }
 };
 </script>
-
-<style lang="scss" scoped>
-.alert.small {
-  padding: $spacer / 2;
-  font-size: 1rem;
-}
-</style>
-- 
cgit v1.2.3

