From 602e98aa32f82fd3b0c3d250c7cc1f8da971db24 Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Wed, 21 Oct 2020 16:20:00 -0500
Subject: Update linting packages to use latest

- 99% of changes were small syntax changes that were changed by the
lint command. There were a couple of small manual changes to meet the
property order patterns established as part of the vue:recommended
guidelines.

There are rules that were set from errors to warnings and new stories
are being opened to address those issues.

Testing:
- Successfully ran npm run serve
- Successfully ran npm run lint
- Verified functionality works as expected, e.g. success and failure use cases
- Resolved any JavaScript errors thrown to the console

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: Ie082f31c73ccbe8a60afa8f88a9ef6dbf33d9fd2
---
 src/components/Global/InputPasswordToggle.vue | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/components/Global/InputPasswordToggle.vue')

diff --git a/src/components/Global/InputPasswordToggle.vue b/src/components/Global/InputPasswordToggle.vue
index 228746cf..bf3e4ca5 100644
--- a/src/components/Global/InputPasswordToggle.vue
+++ b/src/components/Global/InputPasswordToggle.vue
@@ -31,7 +31,7 @@ export default {
   components: { IconView, IconViewOff },
   data() {
     return {
-      isVisible: false
+      isVisible: false,
     };
   },
   methods: {
@@ -44,8 +44,8 @@ export default {
       if (inputEl.nodeName === 'INPUT') {
         inputEl.type = this.isVisible ? 'text' : 'password';
       }
-    }
-  }
+    },
+  },
 };
 </script>
 
-- 
cgit v1.2.3

