From 3559304f98ec05adda43af0035cc9608cf6314af Mon Sep 17 00:00:00 2001
From: Dixsie Wolmers <dixsie@ibm.com>
Date: Fri, 17 Jul 2020 09:38:12 -0500
Subject: Update LoadingBar component

Adds "striped" and "animated" prop to loading
component to improve user experience when
saving or loading on a page.

Signed-off-by: Dixsie Wolmers <dixsie@ibm.com>
Change-Id: Ie1c3c253172486a5915cdc79952271bad846cfde
---
 src/components/Global/LoadingBar.vue | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/Global/LoadingBar.vue')

diff --git a/src/components/Global/LoadingBar.vue b/src/components/Global/LoadingBar.vue
index ee333404..d1736d6a 100644
--- a/src/components/Global/LoadingBar.vue
+++ b/src/components/Global/LoadingBar.vue
@@ -2,6 +2,8 @@
   <transition name="fade">
     <b-progress v-if="!isLoadingComplete" height="0.4rem">
       <b-progress-bar
+        striped
+        animated
         :value="loadingIndicatorValue"
         :aria-label="$t('global.ariaLabel.progressBar')"
       />
-- 
cgit v1.2.3

