From 8ff08526ed51de14d9fb0a0850429bcfefd4a6b5 Mon Sep 17 00:00:00 2001
From: SurenNeware <sneware9@in.ibm.com>
Date: Fri, 28 Aug 2020 20:01:55 +0530
Subject: Increase the global margin size for page section

- Increase the global margin bottom size to 4rem for the page section.
- Kept same size for responsive sizes.

Signed-off-by: Suren Neware <sneware9@in.ibm.com>
Change-Id: I155006a0ea9a7f6fd947d6daaea4510cadf641db
---
 src/components/Global/PageSection.vue | 8 +-------
 1 file changed, 1 insertion(+), 7 deletions(-)

(limited to 'src/components/Global/PageSection.vue')

diff --git a/src/components/Global/PageSection.vue b/src/components/Global/PageSection.vue
index 48bb8a19..303b6e1e 100644
--- a/src/components/Global/PageSection.vue
+++ b/src/components/Global/PageSection.vue
@@ -19,17 +19,11 @@ export default {
 
 <style lang="scss" scoped>
 .page-section {
-  margin-bottom: $spacer * 2;
+  margin-bottom: $spacer * 4;
 }
 
 h2 {
   @include font-size($h3-font-size);
   margin-bottom: $spacer;
-  &::after {
-    content: '';
-    display: block;
-    width: 100px;
-    margin-top: 10px;
-  }
 }
 </style>
-- 
cgit v1.2.3

