From 09e45cd4f5e233d4ec75c086dd7ab912a2f79a41 Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Thu, 23 Jan 2020 15:45:57 -0600
Subject: Change eslint rules to use vue recommended
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Resubmitting after reverted–original commit here
https://gerrit.openbmc-project.xyz/c/openbmc/webui-vue/+/28763/7

- Ran npm run lint
- Resolved eslint issues

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: I2b8b9244acddd483d0a72f9a5d156a79de9869a0
---
 src/components/Global/StatusIcon.vue | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'src/components/Global/StatusIcon.vue')

diff --git a/src/components/Global/StatusIcon.vue b/src/components/Global/StatusIcon.vue
index 63155c9a..a2c7f04f 100644
--- a/src/components/Global/StatusIcon.vue
+++ b/src/components/Global/StatusIcon.vue
@@ -13,11 +13,16 @@ import IconError from '@carbon/icons-vue/es/error--filled/20';
 
 export default {
   name: 'StatusIcon',
-  props: ['status'],
   components: {
     iconSuccess: IconCheckmark,
     iconDanger: IconWarning,
     iconSecondary: IconError
+  },
+  props: {
+    status: {
+      type: String,
+      default: ''
+    }
   }
 };
 </script>
-- 
cgit v1.2.3

