From c4844b457cb7eeb8cab0ee8dca179be684a38b17 Mon Sep 17 00:00:00 2001
From: Gunnar Mills <gmills@us.ibm.com>
Date: Tue, 28 Jan 2020 20:18:40 -0600
Subject: Revert "Change eslint rules to use vue recommended"

Merged accidentally. Although this one did have the proper +1s/+2s.
The 2 underneath did not. The author will resubmit.

This reverts commit 5e7ac49058e5dc37fd43ecf3c0d06f5dda14af5b.

Change-Id: Iceb1de3a170cc0b592b183545c792aa3eb87bfee
Signed-off-by: Gunnar Mills <gmills@us.ibm.com>
---
 src/components/Global/StatusIcon.vue | 7 +------
 1 file changed, 1 insertion(+), 6 deletions(-)

(limited to 'src/components/Global/StatusIcon.vue')

diff --git a/src/components/Global/StatusIcon.vue b/src/components/Global/StatusIcon.vue
index a2c7f04f..63155c9a 100644
--- a/src/components/Global/StatusIcon.vue
+++ b/src/components/Global/StatusIcon.vue
@@ -13,16 +13,11 @@ import IconError from '@carbon/icons-vue/es/error--filled/20';
 
 export default {
   name: 'StatusIcon',
+  props: ['status'],
   components: {
     iconSuccess: IconCheckmark,
     iconDanger: IconWarning,
     iconSecondary: IconError
-  },
-  props: {
-    status: {
-      type: String,
-      default: ''
-    }
   }
 };
 </script>
-- 
cgit v1.2.3

