From 602e98aa32f82fd3b0c3d250c7cc1f8da971db24 Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Wed, 21 Oct 2020 16:20:00 -0500
Subject: Update linting packages to use latest

- 99% of changes were small syntax changes that were changed by the
lint command. There were a couple of small manual changes to meet the
property order patterns established as part of the vue:recommended
guidelines.

There are rules that were set from errors to warnings and new stories
are being opened to address those issues.

Testing:
- Successfully ran npm run serve
- Successfully ran npm run lint
- Verified functionality works as expected, e.g. success and failure use cases
- Resolved any JavaScript errors thrown to the console

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: Ie082f31c73ccbe8a60afa8f88a9ef6dbf33d9fd2
---
 src/components/Global/TableToolbar.vue | 18 +++++++++---------
 1 file changed, 9 insertions(+), 9 deletions(-)

(limited to 'src/components/Global/TableToolbar.vue')

diff --git a/src/components/Global/TableToolbar.vue b/src/components/Global/TableToolbar.vue
index 97d8f641..6a856b44 100644
--- a/src/components/Global/TableToolbar.vue
+++ b/src/components/Global/TableToolbar.vue
@@ -36,34 +36,34 @@ export default {
   props: {
     selectedItemsCount: {
       type: Number,
-      required: true
+      required: true,
     },
     actions: {
       type: Array,
       default: () => [],
-      validator: prop => {
-        return prop.every(action => {
+      validator: (prop) => {
+        return prop.every((action) => {
           return (
             action.hasOwnProperty('value') && action.hasOwnProperty('label')
           );
         });
-      }
-    }
+      },
+    },
   },
   data() {
     return {
-      isToolbarActive: false
+      isToolbarActive: false,
     };
   },
   watch: {
-    selectedItemsCount: function(selectedItemsCount) {
+    selectedItemsCount: function (selectedItemsCount) {
       if (selectedItemsCount > 0) {
         this.isToolbarActive = true;
       } else {
         this.isToolbarActive = false;
       }
-    }
-  }
+    },
+  },
 };
 </script>
 
-- 
cgit v1.2.3

