From c604f17de58a2af80adc525196464ad59bad98ab Mon Sep 17 00:00:00 2001
From: Anna Tsyganova <ATSyganova@IBS.RU>
Date: Wed, 27 Jul 2022 17:05:14 +0300
Subject: SILABMC-191: Fix header

---
 src/components/_sila/AppHeader/AppHeader.vue | 26 +-------------------------
 1 file changed, 1 insertion(+), 25 deletions(-)

(limited to 'src/components/_sila/AppHeader/AppHeader.vue')

diff --git a/src/components/_sila/AppHeader/AppHeader.vue b/src/components/_sila/AppHeader/AppHeader.vue
index 9791c10c..165d744e 100644
--- a/src/components/_sila/AppHeader/AppHeader.vue
+++ b/src/components/_sila/AppHeader/AppHeader.vue
@@ -49,7 +49,7 @@
           </div>
         </b-navbar-nav>
         <!-- Right aligned nav items -->
-        <b-navbar-nav class="ml-auto helper-menu">
+        <b-navbar-nav class="ml-auto">
           <b-nav-item
             to="/logs/event-logs"
             data-test-id="appHeader-container-health"
@@ -281,30 +281,6 @@ export default {
     @include media-breakpoint-up($responsive-layout-bp) {
       height: $header-height;
     }
-
-    .helper-menu {
-      @include media-breakpoint-down(sm) {
-        background-color: gray('800');
-        width: 100%;
-        justify-content: flex-end;
-
-        .nav-link,
-        .btn {
-          padding: $spacer / 1.125 $spacer / 2;
-        }
-
-        .nav-link:focus,
-        .btn:focus {
-          @include focus-box-shadow($gray-800);
-        }
-      }
-
-      .responsive-text {
-        @include media-breakpoint-down(xs) {
-          @include sr-only;
-        }
-      }
-    }
   }
 
   .navbar-nav {
-- 
cgit v1.2.3

