From 5f0a32de6dc2d0479dfc2b1693602687252501ba Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Mon, 22 Aug 2022 09:43:38 +0300
Subject: SILABMC-269: move up  reset Button

---
 src/components/_sila/Global/Chart.vue | 10 ++++++++--
 1 file changed, 8 insertions(+), 2 deletions(-)

(limited to 'src/components/_sila/Global/Chart.vue')

diff --git a/src/components/_sila/Global/Chart.vue b/src/components/_sila/Global/Chart.vue
index 7c66cf0c..12f58307 100644
--- a/src/components/_sila/Global/Chart.vue
+++ b/src/components/_sila/Global/Chart.vue
@@ -135,9 +135,15 @@ export default {
       return {
         chart: {
           type: 'spline',
-          margin: [12, 50, 32, 60],
-          height: '320px',
+          margin: [42, 50, 32, 60],
+          height: '350px',
           zoomType: 'x',
+          resetZoomButton: {
+            position: {
+              x: 0,
+              y: -40,
+            },
+          },
         },
         title: null,
         xAxis: {
-- 
cgit v1.2.3

