From 383571357baa54fd5c46de096349b7b0213a203e Mon Sep 17 00:00:00 2001
From: Sukanya Pandey <sukapan1@in.ibm.com>
Date: Tue, 22 Dec 2020 13:40:59 +0530
Subject: Add translated cancel title to all modals

Signed-off-by: Sukanya Pandey <sukapan1@in.ibm.com>
Change-Id: I24ea692467077eddc7a74b86a9ba56d49818404b
---
 src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue')

diff --git a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
index 426d5c25..fe87e083 100644
--- a/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
+++ b/src/env/components/FirmwareSingleImage/FirmwareSingleImage.vue
@@ -385,6 +385,7 @@ export default {
         .msgBoxConfirm(this.$t('pageFirmware.modal.serverShutdownMessage'), {
           title: this.$t('pageFirmware.modal.serverShutdownWillCauseOutage'),
           okTitle: this.$t('pageFirmware.modal.shutDownServer'),
+          cancelTitle: this.$t('global.action.cancel'),
           okVariant: 'danger',
         })
         .then((shutdownConfirmed) => {
-- 
cgit v1.2.3

