From 14172d745cec46a6ad4cce61eb02df962eb4f309 Mon Sep 17 00:00:00 2001
From: kennyneedsmilky <kennyneedsmilky@gmail.com>
Date: Wed, 10 Nov 2021 15:26:07 -0600
Subject: Fixed refresh system info on header

The refresh button in the App header previously only re-rendered
the main mage section, this change also refreshes the app header
and main content.

Signed-off-by: Kenneth Fullbright <kennyneedsmilky@gmail.com>
Change-Id: Iff7f3f14bca8ddfd815ccb1b87dd182c4bfd79ba
---
 src/layouts/AppLayout.vue | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'src/layouts/AppLayout.vue')

diff --git a/src/layouts/AppLayout.vue b/src/layouts/AppLayout.vue
index 41b2e443..0b78e5b1 100644
--- a/src/layouts/AppLayout.vue
+++ b/src/layouts/AppLayout.vue
@@ -1,6 +1,11 @@
 <template>
   <div class="app-container">
-    <app-header ref="focusTarget" class="app-header" @refresh="refresh" />
+    <app-header
+      ref="focusTarget"
+      class="app-header"
+      :router-key="routerKey"
+      @refresh="refresh"
+    />
     <app-navigation class="app-navigation" />
     <page-container class="app-content">
       <router-view ref="routerView" :key="routerKey" />
-- 
cgit v1.2.3

