From 6f71284973ee2f0b35fb22fa36a1afa883a0cc7a Mon Sep 17 00:00:00 2001
From: Yoshie Muranaka <yoshiemuranaka@gmail.com>
Date: Thu, 4 Feb 2021 11:23:03 -0800
Subject: Update single file firmware upload page

These updates are visible with IBM dotenv variables. Updates
include changes to layout and verbiage.

- Added a global application refresh listener, so app refresh
  can be called from components outside of the application header

Signed-off-by: Yoshie Muranaka <yoshiemuranaka@gmail.com>
Change-Id: I5ebe6452a0360b6cced5597b648cde33e97c5a1f
---
 src/layouts/AppLayout.vue | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'src/layouts/AppLayout.vue')

diff --git a/src/layouts/AppLayout.vue b/src/layouts/AppLayout.vue
index 228b25cd..c2023dfb 100644
--- a/src/layouts/AppLayout.vue
+++ b/src/layouts/AppLayout.vue
@@ -48,6 +48,9 @@ export default {
       });
     },
   },
+  mounted() {
+    this.$root.$on('refresh-application', () => this.refresh());
+  },
   methods: {
     refresh() {
       // Changing the component :key value will trigger
-- 
cgit v1.2.3

