From f14b8994d0d50bc63f8ba9c7fd018c29fa0d8ce0 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Fri, 7 Oct 2022 09:57:23 +0300
Subject: fix login

---
 src/layouts/_sila/LoginLayout.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/layouts/_sila/LoginLayout.vue')

diff --git a/src/layouts/_sila/LoginLayout.vue b/src/layouts/_sila/LoginLayout.vue
index a3773d58..7629f2b7 100644
--- a/src/layouts/_sila/LoginLayout.vue
+++ b/src/layouts/_sila/LoginLayout.vue
@@ -35,7 +35,7 @@ export default {
 .login-aside {
   min-height: 100vh;
   & > img {
-    height: 100vh;
+    height: 100%;
   }
 }
 
-- 
cgit v1.2.3

