From 96b37af1433f635fc6bb107961a352721a720326 Mon Sep 17 00:00:00 2001
From: Mateusz Gapski <mateuszx.gapski@intel.com>
Date: Fri, 4 Sep 2020 14:11:55 +0200
Subject: Fix responsiveness of KVM

More info: https://github.com/openbmc/webui-vue/issues/24

Signed-off-by: Mateusz Gapski <mateuszx.gapski@intel.com>
Change-Id: I150e7816ea08f462300566276ddbfc117e9f2e0c
---
 src/views/Control/Kvm/Kvm.vue | 33 ++++-----------------------------
 1 file changed, 4 insertions(+), 29 deletions(-)

(limited to 'src/views/Control/Kvm/Kvm.vue')

diff --git a/src/views/Control/Kvm/Kvm.vue b/src/views/Control/Kvm/Kvm.vue
index 195948b0..66b2e5f7 100644
--- a/src/views/Control/Kvm/Kvm.vue
+++ b/src/views/Control/Kvm/Kvm.vue
@@ -1,44 +1,19 @@
 <template>
   <b-container fluid="xl">
     <page-title />
-
-    <page-section :section-title="$t('pageKvm.subTitle')">
-      <div>
-        <b-button
-          variant="link"
-          type="button"
-          class="button-launch"
-          @click="openConsoleWindow()"
-        >
-          <icon-launch />
-          {{ $t('pageKvm.openNewTab') }}
-        </b-button>
-      </div>
-      <div class="terminal-container">
-        <kvm-console />
-      </div>
-    </page-section>
+    <div class="terminal-container">
+      <kvm-console :is-full-window="false" />
+    </div>
   </b-container>
 </template>
 
 <script>
-import IconLaunch from '@carbon/icons-vue/es/launch/32';
 import PageTitle from '@/components/Global/PageTitle';
-import PageSection from '@/components/Global/PageSection';
 import KvmConsole from './KvmConsole';
 
 export default {
   name: 'Kvm',
-  components: { IconLaunch, PageSection, PageTitle, KvmConsole },
-  methods: {
-    openConsoleWindow() {
-      window.open(
-        '#/console/kvm',
-        '_blank',
-        'directories=no,titlebar=no,toolbar=no,location=no,status=no,menubar=no,scrollbars=no,resizable=yes,width=600,height=550'
-      );
-    }
-  }
+  components: { PageTitle, KvmConsole }
 };
 </script>
 
-- 
cgit v1.2.3

