From 602e98aa32f82fd3b0c3d250c7cc1f8da971db24 Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Wed, 21 Oct 2020 16:20:00 -0500
Subject: Update linting packages to use latest

- 99% of changes were small syntax changes that were changed by the
lint command. There were a couple of small manual changes to meet the
property order patterns established as part of the vue:recommended
guidelines.

There are rules that were set from errors to warnings and new stories
are being opened to address those issues.

Testing:
- Successfully ran npm run serve
- Successfully ran npm run lint
- Verified functionality works as expected, e.g. success and failure use cases
- Resolved any JavaScript errors thrown to the console

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: Ie082f31c73ccbe8a60afa8f88a9ef6dbf33d9fd2
---
 .../Control/SerialOverLan/SerialOverLanConsole.vue | 22 +++++++++++-----------
 1 file changed, 11 insertions(+), 11 deletions(-)

(limited to 'src/views/Control/SerialOverLan/SerialOverLanConsole.vue')

diff --git a/src/views/Control/SerialOverLan/SerialOverLanConsole.vue b/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
index d5e9b214..b734bb13 100644
--- a/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
+++ b/src/views/Control/SerialOverLan/SerialOverLanConsole.vue
@@ -42,13 +42,13 @@ export default {
   name: 'SerialOverLanConsole',
   components: {
     IconLaunch,
-    StatusIcon
+    StatusIcon,
   },
   props: {
     isFullWindow: {
       type: Boolean,
-      default: true
-    }
+      default: true,
+    },
   },
   computed: {
     hostStatus() {
@@ -61,7 +61,7 @@ export default {
       return this.hostStatus === 'on'
         ? this.$t('pageSerialOverLan.connected')
         : this.$t('pageSerialOverLan.disconnected');
-    }
+    },
   },
   created() {
     this.$store.dispatch('global/getHostStatus');
@@ -74,7 +74,7 @@ export default {
       const token = this.$store.getters['authentication/token'];
 
       const ws = new WebSocket(`wss://${window.location.host}/console0`, [
-        token
+        token,
       ]);
 
       // Refer https://github.com/xtermjs/xterm.js/ for xterm implementation and addons.
@@ -82,7 +82,7 @@ export default {
       const term = new Terminal({
         fontSize: 15,
         fontFamily:
-          'SFMono-Regular, Menlo, Monaco, Consolas, Liberation Mono, Courier New, monospace'
+          'SFMono-Regular, Menlo, Monaco, Consolas, Liberation Mono, Courier New, monospace',
       });
 
       const attachAddon = new AttachAddon(ws);
@@ -94,7 +94,7 @@ export default {
       const SOL_THEME = {
         background: '#19273c',
         cursor: 'rgba(83, 146, 255, .5)',
-        scrollbar: 'rgba(83, 146, 255, .5)'
+        scrollbar: 'rgba(83, 146, 255, .5)',
       };
       term.setOption('theme', SOL_THEME);
 
@@ -102,10 +102,10 @@ export default {
       fitAddon.fit();
 
       try {
-        ws.onopen = function() {
+        ws.onopen = function () {
           console.log('websocket console0/ opened');
         };
-        ws.onclose = function(event) {
+        ws.onclose = function (event) {
           console.log(
             'websocket console0/ closed. code: ' +
               event.code +
@@ -123,8 +123,8 @@ export default {
         '_blank',
         'directories=no,titlebar=no,toolbar=no,location=no,status=no,menubar=no,scrollbars=no,resizable=yes,width=600,height=550'
       );
-    }
-  }
+    },
+  },
 };
 </script>
 
-- 
cgit v1.2.3

