From 37b0839703ffce0ca31aafc426852f706b101c46 Mon Sep 17 00:00:00 2001
From: SurenNeware <sneware9@in.ibm.com>
Date: Fri, 17 Jul 2020 15:13:18 +0530
Subject: Add test hooks to server LED page

-Added test id to switch component.

Signed-off-by: Suren Neware <sneware9@in.ibm.com>
Change-Id: I86f7f6d24f2ec70623d9c537755f5760052046cd
---
 src/views/Control/ServerLed/ServerLed.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/views/Control/ServerLed/ServerLed.vue')

diff --git a/src/views/Control/ServerLed/ServerLed.vue b/src/views/Control/ServerLed/ServerLed.vue
index f2e31fce..b2eab0e6 100644
--- a/src/views/Control/ServerLed/ServerLed.vue
+++ b/src/views/Control/ServerLed/ServerLed.vue
@@ -7,6 +7,7 @@
           <b-form-group :label="$t('pageServerLed.serverLedSubTitle')">
             <b-form-checkbox
               v-model="indicatorLed"
+              data-test-id="serverLed-checkbox-switchIndicatorLed"
               name="check-button"
               value="Lit"
               unchecked-value="Off"
-- 
cgit v1.2.3

