From aab99ba9426ae479661d589a16bb4b675ee3e31c Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Wed, 6 Jul 2022 12:48:34 +0300
Subject: upd dynamic logic

---
 .../Fans/DynamicInformation/IndicatorsTable.vue    | 56 ----------------------
 1 file changed, 56 deletions(-)

(limited to 'src/views/Fans/DynamicInformation/IndicatorsTable.vue')

diff --git a/src/views/Fans/DynamicInformation/IndicatorsTable.vue b/src/views/Fans/DynamicInformation/IndicatorsTable.vue
index 22789bc3..933b47a3 100644
--- a/src/views/Fans/DynamicInformation/IndicatorsTable.vue
+++ b/src/views/Fans/DynamicInformation/IndicatorsTable.vue
@@ -104,62 +104,6 @@ export default {
           tdClass: 'bootstrap-fans-table__td light-12px',
         },
       ],
-      items: [
-        {
-          name: 'Вентилятор 1',
-          currentSpeed: 1900,
-          middleSpeed: 1200,
-          minSpeed: 950,
-          minSpeedDate: { time: '15:15', date: '11.11.2021' },
-          maxSpeed: 2100,
-          maxSpeedDate: { time: '10:26', date: '15.11.2021' },
-        },
-        {
-          name: 'Вентилятор 2',
-          currentSpeed: 1850,
-          middleSpeed: 1450,
-          minSpeed: 850,
-          minSpeedDate: { time: '15:45', date: '11.11.2021' },
-          maxSpeed: 2150,
-          maxSpeedDate: { time: '16:59', date: '16.11.2021' },
-        },
-        {
-          name: 'Вентилятор 3',
-          currentSpeed: 1870,
-          middleSpeed: 1450,
-          minSpeed: 1000,
-          minSpeedDate: { time: '15:23', date: '11.11.2021' },
-          maxSpeed: 2050,
-          maxSpeedDate: { time: '15:26', date: '15.11.2021' },
-        },
-        {
-          name: 'Вентилятор 4',
-          currentSpeed: 1790,
-          middleSpeed: 780,
-          minSpeed: 950,
-          minSpeedDate: { time: '16:45', date: '25.11.2021' },
-          maxSpeed: 1800,
-          maxSpeedDate: { time: '11:26', date: '16.11.2021' },
-        },
-        {
-          name: 'Вентилятор 5',
-          currentSpeed: 1950,
-          middleSpeed: 1260,
-          minSpeed: 880,
-          minSpeedDate: { time: '15:23', date: '11.11.2021' },
-          maxSpeed: 1950,
-          maxSpeedDate: { time: '15:26', date: '17.11.2021' },
-        },
-        {
-          name: 'Вентилятор 6',
-          currentSpeed: 1900,
-          middleSpeed: 1300,
-          minSpeed: 960,
-          minSpeedDate: { time: '16:45', date: '25.11.2021' },
-          maxSpeed: 2000,
-          maxSpeedDate: { time: '15:26', date: '15.11.2021' },
-        },
-      ],
     };
   },
 
-- 
cgit v1.2.3

