From 9619d9de108507b3706050a0ea267fee61172478 Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Wed, 29 Jun 2022 17:33:31 +0300
Subject: fix system, led template

---
 src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue')

diff --git a/src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue b/src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue
index cfb9aa84..0589aed8 100644
--- a/src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue
+++ b/src/views/HardwareStatus/Inventory/InventoryServiceIndicator.vue
@@ -5,7 +5,7 @@
   >
     <div class="form-background">
       <b-row>
-        <b-col sm="6" md="3">
+        <b-col md="4">
           <dl>
             <dt>{{ $t('pageInventory.systemIndicator.powerStatus') }}</dt>
             <dd>
@@ -13,7 +13,7 @@
             </dd>
           </dl>
         </b-col>
-        <b-col sm="6" md="3">
+        <b-col md="6">
           <dl>
             <dt>
               {{ $t('pageInventory.systemIndicator.identifyLed') }}
-- 
cgit v1.2.3

