From d0b078f692fc02578b0bfbc3868ce81516c71dd3 Mon Sep 17 00:00:00 2001
From: Glukhov Mikhail <mikl@greenfil.ru>
Date: Sat, 24 Dec 2022 12:16:53 +0300
Subject: Reducing values to a common format

I use this patch to convert all values into the
format <Description>:<Value><Unit of Measure>.
I put the units of measure in a separate
localization area in order to use them in
the sensor page in the future.

Change-Id: Ic6554860c4185bc4d681a97205051799c6637b5c
Signed-off-by: Glukhov Mikhail <mikl@greenfil.ru>
---
 src/views/HardwareStatus/Inventory/InventoryTableChassis.vue | 10 ++++++++--
 1 file changed, 8 insertions(+), 2 deletions(-)

(limited to 'src/views/HardwareStatus/Inventory/InventoryTableChassis.vue')

diff --git a/src/views/HardwareStatus/Inventory/InventoryTableChassis.vue b/src/views/HardwareStatus/Inventory/InventoryTableChassis.vue
index b49cec7f..4c557fa2 100644
--- a/src/views/HardwareStatus/Inventory/InventoryTableChassis.vue
+++ b/src/views/HardwareStatus/Inventory/InventoryTableChassis.vue
@@ -100,10 +100,16 @@
               <dl>
                 <!-- Min power -->
                 <dt>{{ $t('pageInventory.table.minPowerWatts') }}:</dt>
-                <dd>{{ dataFormatter(item.minPowerWatts) }}</dd>
+                <dd>
+                  {{ dataFormatter(item.minPowerWatts) }}
+                  {{ $t('unit.W') }}
+                </dd>
                 <!-- Max power -->
                 <dt>{{ $t('pageInventory.table.maxPowerWatts') }}:</dt>
-                <dd>{{ dataFormatter(item.maxPowerWatts) }}</dd>
+                <dd>
+                  {{ dataFormatter(item.maxPowerWatts) }}
+                  {{ $t('unit.W') }}
+                </dd>
               </dl>
             </b-col>
           </b-row>
-- 
cgit v1.2.3

