From d0b078f692fc02578b0bfbc3868ce81516c71dd3 Mon Sep 17 00:00:00 2001
From: Glukhov Mikhail <mikl@greenfil.ru>
Date: Sat, 24 Dec 2022 12:16:53 +0300
Subject: Reducing values to a common format

I use this patch to convert all values into the
format <Description>:<Value><Unit of Measure>.
I put the units of measure in a separate
localization area in order to use them in
the sensor page in the future.

Change-Id: Ic6554860c4185bc4d681a97205051799c6637b5c
Signed-off-by: Glukhov Mikhail <mikl@greenfil.ru>
---
 .../HardwareStatus/Inventory/InventoryTableProcessors.vue      | 10 ++++++++--
 1 file changed, 8 insertions(+), 2 deletions(-)

(limited to 'src/views/HardwareStatus/Inventory/InventoryTableProcessors.vue')

diff --git a/src/views/HardwareStatus/Inventory/InventoryTableProcessors.vue b/src/views/HardwareStatus/Inventory/InventoryTableProcessors.vue
index 7d5dd700..793dbd86 100644
--- a/src/views/HardwareStatus/Inventory/InventoryTableProcessors.vue
+++ b/src/views/HardwareStatus/Inventory/InventoryTableProcessors.vue
@@ -127,10 +127,16 @@
               <dl>
                 <!-- Min Speed MHz -->
                 <dt>{{ $t('pageInventory.table.minSpeedMHz') }}:</dt>
-                <dd>{{ dataFormatter(item.minSpeedMHz) }}</dd>
+                <dd>
+                  {{ dataFormatter(item.minSpeedMHz) }}
+                  {{ $t('unit.MHz') }}
+                </dd>
                 <!-- Max Speed MHz -->
                 <dt>{{ $t('pageInventory.table.maxSpeedMHz') }}:</dt>
-                <dd>{{ dataFormatter(item.maxSpeedMHz) }}</dd>
+                <dd>
+                  {{ dataFormatter(item.maxSpeedMHz) }}
+                  {{ $t('unit.MHz') }}
+                </dd>
                 <!-- Total Cores -->
                 <dt>{{ $t('pageInventory.table.totalCores') }}:</dt>
                 <dd>{{ dataFormatter(item.totalCores) }}</dd>
-- 
cgit v1.2.3

