From a35b5a15ab7df82cde190698e18dbb3a0e5da075 Mon Sep 17 00:00:00 2001
From: SurenNeware <sneware9@in.ibm.com>
Date: Tue, 13 Oct 2020 17:08:20 +0530
Subject: Fixed event logs pagination on small screen

Signed-off-by: Suren Neware <sneware9@in.ibm.com>
Change-Id: Ifb3963d416a7e2663af24c3c7b1d2c1876af6788
---
 src/views/Health/EventLogs/EventLogs.vue | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'src/views/Health/EventLogs/EventLogs.vue')

diff --git a/src/views/Health/EventLogs/EventLogs.vue b/src/views/Health/EventLogs/EventLogs.vue
index af576521..22a62837 100644
--- a/src/views/Health/EventLogs/EventLogs.vue
+++ b/src/views/Health/EventLogs/EventLogs.vue
@@ -116,7 +116,7 @@
 
     <!-- Table pagination -->
     <b-row>
-      <b-col class="d-md-flex justify-content-between">
+      <b-col sm="6">
         <b-form-group
           class="table-pagination-select"
           :label="$t('global.table.itemsPerPage')"
@@ -128,6 +128,8 @@
             :options="itemsPerPageOptions"
           />
         </b-form-group>
+      </b-col>
+      <b-col sm="6">
         <b-pagination
           v-model="currentPage"
           first-number
-- 
cgit v1.2.3

