From edb8a77437d95242ec1ddb98667b0c117a2fb36c Mon Sep 17 00:00:00 2001
From: Sukanya Pandey <sukapan1@in.ibm.com>
Date: Thu, 29 Oct 2020 11:33:42 +0530
Subject: Resolve custom-event-name-casing lint warnings

Signed-off-by: Sukanya Pandey <sukapan1@in.ibm.com>
Change-Id: I9eea4eac3b8cacc216fc9ad1011e51622622e75f
---
 src/views/Health/HardwareStatus/HardwareStatus.vue | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'src/views/Health/HardwareStatus/HardwareStatus.vue')

diff --git a/src/views/Health/HardwareStatus/HardwareStatus.vue b/src/views/Health/HardwareStatus/HardwareStatus.vue
index 24f02953..0869e286 100644
--- a/src/views/Health/HardwareStatus/HardwareStatus.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatus.vue
@@ -57,27 +57,27 @@ export default {
   created() {
     this.startLoader();
     const systemTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::system::complete', () => resolve());
+      this.$root.$on('hardware-status-system-complete', () => resolve());
     });
     const bmcManagerTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::bmcManager::complete', () => resolve());
+      this.$root.$on('hardware-status-bmc-manager-complete', () => resolve());
     });
     const chassisTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::chassis::complete', () => resolve());
+      this.$root.$on('hardware-status-chassis-complete', () => resolve());
     });
     const dimmSlotTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::dimmSlot::complete', () => resolve());
+      this.$root.$on('hardware-status-dimm-slot-complete', () => resolve());
     });
     const fansTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::fans::complete', () => resolve());
+      this.$root.$on('hardware-status-fans-complete', () => resolve());
     });
     const powerSuppliesTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::powerSupplies::complete', () =>
+      this.$root.$on('hardware-status-power-supplies-complete', () =>
         resolve()
       );
     });
     const processorsTablePromise = new Promise((resolve) => {
-      this.$root.$on('hardwareStatus::processors::complete', () => resolve());
+      this.$root.$on('hardware-status-processors-complete', () => resolve());
     });
     // Combine all child component Promises to indicate
     // when page data load complete
-- 
cgit v1.2.3

