From 787635a2adc8863d7198be09871087a8642b4ea9 Mon Sep 17 00:00:00 2001
From: SurenNeware <sneware9@in.ibm.com>
Date: Tue, 24 Nov 2020 22:42:42 +0530
Subject: Add alignment on Event Logs page

- Align table search, count and date components on Event Logs page.

Signed-off-by: Suren Neware <sneware9@in.ibm.com>
Change-Id: Id681d50f57a6fca86b8d8ba57f8e3420c1a0e56e
---
 src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue')

diff --git a/src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue b/src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue
index d6a12871..6e2ebdae 100644
--- a/src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue
+++ b/src/views/Health/HardwareStatus/HardwareStatusTableProcessors.vue
@@ -1,7 +1,7 @@
 <template>
   <page-section :section-title="$t('pageHardwareStatus.processors')">
     <!-- Search -->
-    <b-row>
+    <b-row class="align-items-end">
       <b-col sm="6" md="5" xl="4">
         <search
           @change-search="onChangeSearchInput"
-- 
cgit v1.2.3

