From 702ba3ee5126449ef6df744d4ae4766ddba7dfb1 Mon Sep 17 00:00:00 2001
From: Dixsie Wolmers <dixsie@ibm.com>
Date: Thu, 5 Mar 2020 16:51:09 -0600
Subject: Update Language translation menu
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Based on community feedback, language options should be displayed
in native language, e.g Spanish -> Español

Signed-off-by: Dixsie Wolmers <dixsie@ibm.com>
Change-Id: Ic066ade3262db7594de851f7219b653ea87af4c3
---
 src/views/Login/Login.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/Login/Login.vue')

diff --git a/src/views/Login/Login.vue b/src/views/Login/Login.vue
index fd6e711c..bed58dc6 100644
--- a/src/views/Login/Login.vue
+++ b/src/views/Login/Login.vue
@@ -97,11 +97,11 @@ export default {
       languages: [
         {
           value: 'en-US',
-          text: this.$t('pageLogin.form.english')
+          text: 'English'
         },
         {
           value: 'es',
-          text: this.$t('pageLogin.form.spanish')
+          text: 'Español'
         }
       ]
     };
-- 
cgit v1.2.3

