From aaff26ef8262df7d6b5bfdd5da52b75a158a4ec5 Mon Sep 17 00:00:00 2001
From: Dixsie Wolmers <dixsie@ibm.com>
Date: Thu, 9 Sep 2021 12:58:08 -0500
Subject: Fix broken link on firmware page

The route for server power ops was moved from `control`
to `operations` during the IA updates.

Signed-off-by: Dixsie Wolmers <dixsie@ibm.com>
Change-Id: I01e6c3d06afc39ec752850f584e46305c7d87dfa
---
 src/views/Operations/Firmware/FirmwareAlertServerPower.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/Operations/Firmware/FirmwareAlertServerPower.vue')

diff --git a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
index 2a3bcba1..24aa1d69 100644
--- a/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
+++ b/src/views/Operations/Firmware/FirmwareAlertServerPower.vue
@@ -21,7 +21,7 @@
           </li>
         </ul>
         <template #action>
-          <b-link to="/control/server-power-operations">
+          <b-link to="/operations/server-power-operations">
             {{ $t('pageFirmware.alert.viewServerPowerOperations') }}
           </b-link>
         </template>
-- 
cgit v1.2.3

