From 68cbbe9014cbdcf7229a878f564d38f6d6199f25 Mon Sep 17 00:00:00 2001
From: Sandeepa Singh <sandeepa.singh@ibm.com>
Date: Wed, 14 Jul 2021 16:02:22 +0530
Subject: IA update: Update control section to operations

This is the third update to the information architecture changes and
has the following changes:

- The control section has been updated to operations
- The server led page has been removed
- The firmware page is moved to operations section

Signed-off-by: Sandeepa Singh <sandeepa.singh@ibm.com>
Change-Id: I2e23da447890d7bee51892e1f782d5f2db6dded4
---
 .../Operations/SerialOverLan/SerialOverLan.vue     | 24 ++++++++++++++++++++++
 1 file changed, 24 insertions(+)
 create mode 100644 src/views/Operations/SerialOverLan/SerialOverLan.vue

(limited to 'src/views/Operations/SerialOverLan/SerialOverLan.vue')

diff --git a/src/views/Operations/SerialOverLan/SerialOverLan.vue b/src/views/Operations/SerialOverLan/SerialOverLan.vue
new file mode 100644
index 00000000..48a68345
--- /dev/null
+++ b/src/views/Operations/SerialOverLan/SerialOverLan.vue
@@ -0,0 +1,24 @@
+<template>
+  <b-container fluid="xl">
+    <page-title class="mb-4" :description="$t('pageSerialOverLan.subTitle')" />
+
+    <page-section class="mb-0">
+      <serial-over-lan-console :is-full-window="false" />
+    </page-section>
+  </b-container>
+</template>
+
+<script>
+import PageTitle from '@/components/Global/PageTitle';
+import PageSection from '@/components/Global/PageSection';
+import SerialOverLanConsole from './SerialOverLanConsole';
+
+export default {
+  name: 'SerialOverLan',
+  components: {
+    PageSection,
+    PageTitle,
+    SerialOverLanConsole,
+  },
+};
+</script>
-- 
cgit v1.2.3

