From 8132399c29a07b783d2b24ccd80da7676460dbf3 Mon Sep 17 00:00:00 2001
From: Ed Tanous <ed@tanous.net>
Date: Tue, 27 Feb 2024 11:26:24 -0800
Subject: Reformat files with new linter

All changes should be whitespace, and were done using npm run-script
lint.

Change-Id: I943c6b435c5c872841af5affc1e89910468b5ca6
Signed-off-by: Ed Tanous <ed@tanous.net>
---
 .../ServerPowerOperations/ServerPowerOperations.vue           | 11 +++++------
 1 file changed, 5 insertions(+), 6 deletions(-)

(limited to 'src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue')

diff --git a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
index ba9ebced..e3864b4a 100644
--- a/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
+++ b/src/views/Operations/ServerPowerOperations/ServerPowerOperations.vue
@@ -189,9 +189,8 @@ export default {
       return this.$store.getters['serverBootSettings/overrideEnabled'];
     },
     hasBootSourceOptions() {
-      let bootOptions = this.$store.getters[
-        'serverBootSettings/bootSourceOptions'
-      ];
+      let bootOptions =
+        this.$store.getters['serverBootSettings/bootSourceOptions'];
       return bootOptions.length !== 0;
     },
   },
@@ -199,7 +198,7 @@ export default {
     this.startLoader();
     const bootSettingsPromise = new Promise((resolve) => {
       this.$root.$on('server-power-operations-boot-settings-complete', () =>
-        resolve()
+        resolve(),
       );
     });
     Promise.all([
@@ -214,7 +213,7 @@ export default {
     },
     rebootServer() {
       const modalMessage = this.$t(
-        'pageServerPowerOperations.modal.confirmRebootMessage'
+        'pageServerPowerOperations.modal.confirmRebootMessage',
       );
       const modalOptions = {
         title: this.$t('pageServerPowerOperations.modal.confirmRebootTitle'),
@@ -238,7 +237,7 @@ export default {
     },
     shutdownServer() {
       const modalMessage = this.$t(
-        'pageServerPowerOperations.modal.confirmShutdownMessage'
+        'pageServerPowerOperations.modal.confirmShutdownMessage',
       );
       const modalOptions = {
         title: this.$t('pageServerPowerOperations.modal.confirmShutdownTitle'),
-- 
cgit v1.2.3

