From 75d3fb7e687979b63f0bb3f64f20e21758e7fffa Mon Sep 17 00:00:00 2001
From: Dixsie Wolmers <dixsie@ibm.com>
Date: Mon, 10 Feb 2020 21:58:55 -0600
Subject: Translate overview page

- Power cap and power consumption state is translated
  in the store
- Static overview text is translated in the template

Signed-off-by: Dixsie Wolmers <dixsie@ibm.com>
Change-Id: I9463072e38c82b4660743ba9785a606ef1c69eae
---
 src/views/Overview/OverviewEvents.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/Overview/OverviewEvents.vue')

diff --git a/src/views/Overview/OverviewEvents.vue b/src/views/Overview/OverviewEvents.vue
index d15e158f..a08fb549 100644
--- a/src/views/Overview/OverviewEvents.vue
+++ b/src/views/Overview/OverviewEvents.vue
@@ -14,7 +14,7 @@
       </b-list-group-item>
     </b-list-group>
     <b-list-group v-if="eventLogData.length === 0">
-      There are no high priority events to display at this time.
+      {{ $t('overview.events.noHighEventsMsg') }}
     </b-list-group>
   </div>
 </template>
-- 
cgit v1.2.3

