From 828dda9b187684902710bb11621eca27bf0c6eec Mon Sep 17 00:00:00 2001
From: Derick Montague <derick.montague@ibm.com>
Date: Mon, 28 Jun 2021 15:52:22 -0500
Subject: IA update: Add logs and update overview icon

This is the first patchset of the information architecture changes.
These changes are the result of several months of design research with
users to improve the existing information architecture (IA). More
information can we found in the Github story.

This patchset will add a Logs section and move event logs and dumps from
the Health section to the new Logs section. It will also update the icon
used for the Overview page.

Github story: https://github.com/openbmc/webui-vue/issues/56

Testing:
1. IBM build:
  - Logs contained Event logs and dumps
  - Both pages rendered when clicking link
2. Intel build
  - Logs contained Event logs only
  - Logs page rendered when clicking link
3. Tested default build
  - Logs contained Event logs only
  - Logs page rendered when clicking link

Signed-off-by: Derick Montague <derick.montague@ibm.com>
Change-Id: I4621837202cf5ad3469d6ea460d9a5bdc79c8816
---
 src/views/Overview/OverviewEvents.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/Overview/OverviewEvents.vue')

diff --git a/src/views/Overview/OverviewEvents.vue b/src/views/Overview/OverviewEvents.vue
index 885db07c..b8f876ac 100644
--- a/src/views/Overview/OverviewEvents.vue
+++ b/src/views/Overview/OverviewEvents.vue
@@ -2,7 +2,7 @@
   <div>
     <b-button
       variant="link"
-      to="/health/event-logs"
+      to="/logs/event-logs"
       data-test-id="overviewEvents-button-eventLogs"
       class="float-md-right"
     >
-- 
cgit v1.2.3

