From 68cbbe9014cbdcf7229a878f564d38f6d6199f25 Mon Sep 17 00:00:00 2001
From: Sandeepa Singh <sandeepa.singh@ibm.com>
Date: Wed, 14 Jul 2021 16:02:22 +0530
Subject: IA update: Update control section to operations

This is the third update to the information architecture changes and
has the following changes:

- The control section has been updated to operations
- The server led page has been removed
- The firmware page is moved to operations section

Signed-off-by: Sandeepa Singh <sandeepa.singh@ibm.com>
Change-Id: I2e23da447890d7bee51892e1f782d5f2db6dded4
---
 src/views/Overview/OverviewQuickLinks.vue | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'src/views/Overview/OverviewQuickLinks.vue')

diff --git a/src/views/Overview/OverviewQuickLinks.vue b/src/views/Overview/OverviewQuickLinks.vue
index 7e2602e1..9392c56c 100644
--- a/src/views/Overview/OverviewQuickLinks.vue
+++ b/src/views/Overview/OverviewQuickLinks.vue
@@ -41,7 +41,7 @@
     </div>
     <div>
       <b-button
-        to="/control/serial-over-lan"
+        to="/operations/serial-over-lan"
         variant="secondary"
         data-test-id="overviewQuickLinks-button-solConsole"
         class="d-flex justify-content-between align-items-center"
@@ -91,7 +91,6 @@ export default {
           'serverLed/saveIndicatorLedActiveState',
           indicatorLedActiveState
         )
-        .then((message) => this.successToast(message))
         .catch(({ message }) => this.errorToast(message));
     },
   },
-- 
cgit v1.2.3

