From 58d1eb3b899b730877299be6635adceb127fe6a9 Mon Sep 17 00:00:00 2001
From: Anna Tsyganova <ATSyganova@IBS.RU>
Date: Fri, 10 Jun 2022 10:08:22 +0300
Subject: Fix inventory page Id task: SILABMC-155

---
 src/views/SILA/PciDevices/PciDevicesPage.vue | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'src/views/SILA/PciDevices/PciDevicesPage.vue')

diff --git a/src/views/SILA/PciDevices/PciDevicesPage.vue b/src/views/SILA/PciDevices/PciDevicesPage.vue
index 7eb410f2..adf754ac 100644
--- a/src/views/SILA/PciDevices/PciDevicesPage.vue
+++ b/src/views/SILA/PciDevices/PciDevicesPage.vue
@@ -151,10 +151,6 @@ export default {
 </style>
 
 <style lang="scss" scoped>
-.bootstrap-table__section {
-  margin-bottom: 24px;
-}
-
 .bold-16px {
   display: block;
   margin: 25px 0 16px 0;
-- 
cgit v1.2.3

