From c4d70da69a3c86f8c07ccdb0f09b755dd99b2155 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Tue, 24 May 2022 10:04:19 +0300
Subject: Add global popovers. Add pages: pci, adapters, raid, drivers, virtual
 drivers. Fix: analytical pannel, bmc-settings popovers. fix global styles

---
 src/views/SILA/RAID/Cache/RAIDCachePage.vue | 124 ++++++++++++++++++++++++++++
 1 file changed, 124 insertions(+)
 create mode 100644 src/views/SILA/RAID/Cache/RAIDCachePage.vue

(limited to 'src/views/SILA/RAID/Cache/RAIDCachePage.vue')

diff --git a/src/views/SILA/RAID/Cache/RAIDCachePage.vue b/src/views/SILA/RAID/Cache/RAIDCachePage.vue
new file mode 100644
index 00000000..f41cd787
--- /dev/null
+++ b/src/views/SILA/RAID/Cache/RAIDCachePage.vue
@@ -0,0 +1,124 @@
+<template>
+  <b-container
+    :style="{ display: 'flex', 'flex-direction': 'column' }"
+    fluid="xxl pt-0 m-0"
+  >
+    <page-title />
+    <div class="main-container">
+      <data-tabs
+        :slots="raidSlots"
+        :switch-tab="switchRaidSlot"
+        :current-tab="currentRaidSlot"
+        :slot-width="100"
+        :slider-width="79"
+        style="margin-top: 16px"
+      />
+      <page-section class="bootstrap-table__section info_section">
+        <span class="bold-16px">{{ $t('RAID.cache_info') }}</span>
+        <b-table
+          responsive="md"
+          show-empty
+          class="bootstrap-rounded-table"
+          :items="items"
+          :fields="fields"
+          :empty-text="$t('global.table.emptyMessage')"
+        >
+        </b-table>
+      </page-section>
+    </div>
+  </b-container>
+</template>
+
+<script>
+import PageTitle from '@/components/Global/PageTitle';
+import PageSection from '@/components/Global/PageSection';
+import DataTabs from '@/components/Global/SilaComponents/DataTabs';
+
+export default {
+  components: { PageTitle, PageSection, DataTabs },
+  data() {
+    return {
+      currentRaidSlot: 1,
+      raidSlots: [
+        { id: 1, name: 'Контроллер 1' },
+        { id: 2, name: 'Контроллер 2' },
+        { id: 3, name: 'Контроллер 3' },
+      ],
+      fields: [
+        {
+          key: 'parametr',
+          label: 'Параметр',
+          formatter: this.dataFormatter,
+          thClass: 'semi-bold-12px__caps bootstrap-rounded-table__head_bg',
+          class: `bootstrap-rounded-table__column-first
+            cache-table-col-first`,
+          tdClass: 'regular-12px bootstrap-rounded-table__td',
+        },
+        {
+          key: 'value',
+          label: 'Значение',
+          formatter: this.dataFormatter,
+          thClass: 'semi-bold-12px__caps bootstrap-rounded-table__head_bg',
+          class: 'bootstrap-rounded-table__column-last',
+          tdClass: 'regular-12px bootstrap-rounded-table__td',
+        },
+      ],
+      items: [
+        {
+          parametr: 'Статус наличия',
+          value: 'Есть',
+        },
+        {
+          parametr: 'Текущее значение занятой емкости',
+          value: '1 024 000 Мб',
+        },
+        {
+          parametr: 'Текущее значение свободной емкости',
+          value: '1 004 256 Мб',
+        },
+        {
+          parametr: 'Статус наличия BBU',
+          value: 'Есть',
+        },
+        {
+          parametr: 'Статус наличия FBU',
+          value: 'Нет',
+        },
+        {
+          parametr: 'Состояние BBU',
+          value: 'Готов',
+        },
+        {
+          parametr: 'Состояние FBU',
+          value: 'Заряжается',
+        },
+        {
+          parametr: 'Номинальная емкость',
+          value: '1 004 256 Мб',
+        },
+      ],
+    };
+  },
+  methods: {
+    switchRaidSlot(period) {
+      this.currentRaidSlot = period;
+    },
+  },
+};
+</script>
+<style lang="scss">
+.cache-table-col-first {
+  width: 50%;
+}
+</style>
+
+<style lang="scss" scoped>
+.bootstrap-table__section {
+  margin-bottom: 24px;
+}
+
+.bold-16px {
+  display: block;
+  margin: 0 0 16px 0;
+}
+</style>
-- 
cgit v1.2.3

