From a4dcc4486cba71cd751327184a6651ebcba4e935 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Mon, 6 Jun 2022 18:39:19 +0300
Subject: Delete main-container, add global scroll to pages, add global style
 for logs.

---
 .../SystemDescription/Network/SystemNetwork.vue    | 74 +++++++++++-----------
 1 file changed, 36 insertions(+), 38 deletions(-)

(limited to 'src/views/SystemDescription/Network/SystemNetwork.vue')

diff --git a/src/views/SystemDescription/Network/SystemNetwork.vue b/src/views/SystemDescription/Network/SystemNetwork.vue
index 17b48794..72d9e994 100644
--- a/src/views/SystemDescription/Network/SystemNetwork.vue
+++ b/src/views/SystemDescription/Network/SystemNetwork.vue
@@ -5,44 +5,42 @@
   >
     <page-title />
     <!-- IPv4 -->
-    <div class="main-container">
-      <div class="page-collapse-decorator">
-        <b-button
-          v-b-toggle.toggle-collapse_1
-          variant="link"
-          class="collapse-button semi-bold-16px"
-          @click="ipv4Handler"
-        >
-          {{ $t('SystemDescription.title.Ipv4Settings') }}
-          <b-form-checkbox
-            id="checkbox-1"
-            v-model="ipv4"
-            @click.native.prevent
-          ></b-form-checkbox>
-        </b-button>
-        <b-collapse id="toggle-collapse_1" class="nav-item__nav">
-          <i-pv4-settings ref="system" />
-        </b-collapse>
-      </div>
-      <!-- IPv6 -->
-      <div class="page-collapse-decorator">
-        <b-button
-          v-b-toggle.toggle-collapse_2
-          variant="link"
-          class="collapse-button semi-bold-16px"
-          @click="ipv6Handler"
-        >
-          {{ $t('SystemDescription.title.Ipv6Settings') }}
-          <b-form-checkbox
-            id="checkbox-2"
-            v-model="ipv6"
-            @click.native.prevent
-          ></b-form-checkbox>
-        </b-button>
-        <b-collapse id="toggle-collapse_2" class="nav-item__nav">
-          <i-pv6-settings ref="system" />
-        </b-collapse>
-      </div>
+    <div class="page-collapse-decorator">
+      <b-button
+        v-b-toggle.toggle-collapse_1
+        variant="link"
+        class="collapse-button semi-bold-16px"
+        @click="ipv4Handler"
+      >
+        {{ $t('SystemDescription.title.Ipv4Settings') }}
+        <b-form-checkbox
+          id="checkbox-1"
+          v-model="ipv4"
+          @click.native.prevent
+        ></b-form-checkbox>
+      </b-button>
+      <b-collapse id="toggle-collapse_1" class="nav-item__nav">
+        <i-pv4-settings ref="system" />
+      </b-collapse>
+    </div>
+    <!-- IPv6 -->
+    <div class="page-collapse-decorator">
+      <b-button
+        v-b-toggle.toggle-collapse_2
+        variant="link"
+        class="collapse-button semi-bold-16px"
+        @click="ipv6Handler"
+      >
+        {{ $t('SystemDescription.title.Ipv6Settings') }}
+        <b-form-checkbox
+          id="checkbox-2"
+          v-model="ipv6"
+          @click.native.prevent
+        ></b-form-checkbox>
+      </b-button>
+      <b-collapse id="toggle-collapse_2" class="nav-item__nav">
+        <i-pv6-settings ref="system" />
+      </b-collapse>
     </div>
   </b-container>
 </template>
-- 
cgit v1.2.3

