From 6facd12596ec8b55bab4be04b473de65e1f22018 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Tue, 24 May 2022 09:43:34 +0300
Subject: Add depend: highcarts. Pages: power, analytical motherboard, memory,
 fans, event logs, Fix styles, add global components.

---
 src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue')

diff --git a/src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue b/src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue
index e9868b05..a40edb41 100644
--- a/src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue
+++ b/src/views/SystemDescription/ServerParametrs/ServereParametrsSection.vue
@@ -22,7 +22,6 @@
           <b-col>
             <b-form-checkbox
               v-model="queueItems[data.index].active"
-              class="switch-input"
               switch
               @change="toggleLoad"
             >
-- 
cgit v1.2.3

