From ef3485682043168e665ac07085c91e1f51fe4311 Mon Sep 17 00:00:00 2001
From: "Andrey V.Kosteltsev" <AKosteltsev@IBS.RU>
Date: Thu, 7 Jul 2022 19:03:50 +0300
Subject: IBS: Fix import { loading } syntax

---
 src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue')

diff --git a/src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue b/src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue
index 76d67f96..bca682bd 100644
--- a/src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue
+++ b/src/views/_ibs/Operations/Firmware/FirmwareCardsBmc.vue
@@ -54,7 +54,9 @@
 <script>
 import IconSwitch from '@carbon/icons-vue/es/arrows--horizontal/20';
 import PageSection from '@/components/_ibs/Global/PageSection';
-import LoadingBarMixin, { loading } from '@/components/_ibs/Mixins/LoadingBarMixin';
+import LoadingBarMixin, {
+  loading,
+} from '@/components/_ibs/Mixins/LoadingBarMixin';
 import BVToastMixin from '@/components/_ibs/Mixins/BVToastMixin';
 
 import ModalSwitchToRunning from './FirmwareModalSwitchToRunning';
-- 
cgit v1.2.3

