From 6c85919b04002e8871b69ebbcf0835f853d27f27 Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Tue, 26 Jul 2022 10:29:14 +0300
Subject: fx inputs, fans dynamic

---
 src/views/_sila/Fans/Dynamic/FansDynamicPage.vue | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/views/_sila/Fans/Dynamic/FansDynamicPage.vue')

diff --git a/src/views/_sila/Fans/Dynamic/FansDynamicPage.vue b/src/views/_sila/Fans/Dynamic/FansDynamicPage.vue
index 06d66ec8..c27f1cf5 100644
--- a/src/views/_sila/Fans/Dynamic/FansDynamicPage.vue
+++ b/src/views/_sila/Fans/Dynamic/FansDynamicPage.vue
@@ -15,7 +15,7 @@
         {{ $t('pageFans.speed') }}
       </b-button>
       <b-row class="align-items-end p-4">
-        <b-col xs="12" md="3" class="pt-2">
+        <b-col xs="12" md="4" class="pt-2">
           <b-form-group :label="$t('pageFans.labels.warning')">
             <b-form-input
               v-model="fanSpeedWarninigInput"
@@ -26,7 +26,7 @@
             </b-form-input>
           </b-form-group>
         </b-col>
-        <b-col xs="12" md="3" class="pt-2">
+        <b-col xs="12" md="4" class="pt-2">
           <b-form-group :label="$t('pageFans.labels.shutdown')">
             <b-form-input
               v-model="fanSpeedShutdownInput"
@@ -36,7 +36,7 @@
             ></b-form-input>
           </b-form-group>
         </b-col>
-        <b-col xs="12" md="3" class="pt-2">
+        <b-col xs="12" md="4" class="pt-2">
           <b-button variant="primary" style="height: 35px">
             {{ 'Сохранить' }}
           </b-button>
-- 
cgit v1.2.3

