From f12e602ab84f2a4ae28a064ed2058f57b9cf9bc3 Mon Sep 17 00:00:00 2001
From: Anna Tsyganova <ATSyganova@IBS.RU>
Date: Fri, 8 Jul 2022 11:32:33 +0300
Subject: Fix a little global components Issue: SILABMC-191

---
 src/views/_sila/Operations/Kvm/KvmConsole.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/views/_sila/Operations/Kvm/KvmConsole.vue')

diff --git a/src/views/_sila/Operations/Kvm/KvmConsole.vue b/src/views/_sila/Operations/Kvm/KvmConsole.vue
index c028a9fc..50cbff7f 100644
--- a/src/views/_sila/Operations/Kvm/KvmConsole.vue
+++ b/src/views/_sila/Operations/Kvm/KvmConsole.vue
@@ -42,7 +42,7 @@
 
 <script>
 import RFB from '@novnc/novnc/core/rfb';
-import StatusIcon from '@/components/Global/StatusIcon';
+import StatusIcon from '@/components/_sila/Global/StatusIcon';
 import IconLaunch from '@carbon/icons-vue/es/launch/20';
 import IconArrowDown from '@carbon/icons-vue/es/arrow--down/16';
 import { throttle } from 'lodash';
-- 
cgit v1.2.3

