From f12e602ab84f2a4ae28a064ed2058f57b9cf9bc3 Mon Sep 17 00:00:00 2001
From: Anna Tsyganova <ATSyganova@IBS.RU>
Date: Fri, 8 Jul 2022 11:32:33 +0300
Subject: Fix a little global components Issue: SILABMC-191

---
 src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue')

diff --git a/src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue b/src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue
index 694083fd..bf974b51 100644
--- a/src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue
+++ b/src/views/_sila/Operations/SerialOverLan/SerialOverLanConsole.vue
@@ -38,13 +38,13 @@
 </template>
 
 <script>
-import Alert from '@/components/Global/Alert';
+import Alert from '@/components/_sila/Global/Alert';
 import { AttachAddon } from 'xterm-addon-attach';
 import { FitAddon } from 'xterm-addon-fit';
 import { Terminal } from 'xterm';
 import { throttle } from 'lodash';
 import IconLaunch from '@carbon/icons-vue/es/launch/20';
-import StatusIcon from '@/components/Global/StatusIcon';
+import StatusIcon from '@/components/_sila/Global/StatusIcon';
 
 export default {
   name: 'SerialOverLanConsole',
-- 
cgit v1.2.3

