From 46501426b54b69a94ec2cc2f44d01c1d513a8e25 Mon Sep 17 00:00:00 2001
From: Maksim Zakharov <m.zakharov@IBS.RU>
Date: Mon, 8 Aug 2022 14:35:53 +0300
Subject: rm temporally limits for psu dynamics

---
 src/views/_sila/Power/Dynamic/CurrentOutput.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/_sila/Power/Dynamic/CurrentOutput.vue')

diff --git a/src/views/_sila/Power/Dynamic/CurrentOutput.vue b/src/views/_sila/Power/Dynamic/CurrentOutput.vue
index a27a5a57..74c26d1b 100644
--- a/src/views/_sila/Power/Dynamic/CurrentOutput.vue
+++ b/src/views/_sila/Power/Dynamic/CurrentOutput.vue
@@ -8,7 +8,7 @@
       <img src="@/assets/images/_sila/collapsed/current.svg" />
     </template>
     <page-section>
-      <b-row class="align-items-end p-2">
+      <!-- <b-row class="align-items-end p-2">
         <b-col xs="12" md="6" lg="4" class="pt-2">
           <b-form-group :label="$t('pagePowerSup.labels.warning')">
             <b-form-input
@@ -35,7 +35,7 @@
             {{ $t('global.action.save') }}
           </b-button>
         </b-col>
-      </b-row>
+      </b-row> -->
       <chart
         type="current"
         :time-scale="timeScale"
-- 
cgit v1.2.3

