From 0dc0658716077efebdc875d24bc4de5892c0070f Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Fri, 19 Aug 2022 13:15:29 +0300
Subject: mock power

---
 src/views/_sila/Power/Dynamic/VoltInput.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/_sila/Power/Dynamic/VoltInput.vue')

diff --git a/src/views/_sila/Power/Dynamic/VoltInput.vue b/src/views/_sila/Power/Dynamic/VoltInput.vue
index 2843c27e..38f7c077 100644
--- a/src/views/_sila/Power/Dynamic/VoltInput.vue
+++ b/src/views/_sila/Power/Dynamic/VoltInput.vue
@@ -8,7 +8,7 @@
       <img src="@/assets/images/_sila/collapsed/voltage.svg" />
     </template>
     <page-section>
-      <b-row class="align-items-end limit-container">
+      <!--      <b-row class="align-items-end limit-container">
         <b-col xs="12" sm="6" xl="3" class="pt-4">
           <b-form-group :label="$t('pagePowerSup.labels.warning')">
             <b-form-input
@@ -35,7 +35,7 @@
             {{ $t('global.action.save') }}
           </b-button>
         </b-col>
-      </b-row>
+      </b-row>-->
       <chart
         type="voltage-input"
         :time-scale="timeScale"
-- 
cgit v1.2.3

