From 0dc0658716077efebdc875d24bc4de5892c0070f Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Fri, 19 Aug 2022 13:15:29 +0300
Subject: mock power

---
 src/views/_sila/Power/Dynamic/VoltOutput.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/_sila/Power/Dynamic/VoltOutput.vue')

diff --git a/src/views/_sila/Power/Dynamic/VoltOutput.vue b/src/views/_sila/Power/Dynamic/VoltOutput.vue
index 91767f70..f657b064 100644
--- a/src/views/_sila/Power/Dynamic/VoltOutput.vue
+++ b/src/views/_sila/Power/Dynamic/VoltOutput.vue
@@ -104,8 +104,8 @@ export default {
   },
   data() {
     return {
-      warning: 72,
-      shutdown: 95,
+      warning: Infinity,
+      shutdown: Infinity,
       isBusy: true,
       fields: [
         {
-- 
cgit v1.2.3

