From 7e74f9412c80e5462798b2d9b62a12f570aa9c95 Mon Sep 17 00:00:00 2001
From: Vitalii Lysak <v.lysak@dunice.net>
Date: Mon, 8 Aug 2022 12:22:36 +0300
Subject: rm temporally limits for dyn

---
 src/views/_sila/Processors/Dynamic/CpuTemp.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/views/_sila/Processors/Dynamic/CpuTemp.vue')

diff --git a/src/views/_sila/Processors/Dynamic/CpuTemp.vue b/src/views/_sila/Processors/Dynamic/CpuTemp.vue
index d934acc3..756f3808 100644
--- a/src/views/_sila/Processors/Dynamic/CpuTemp.vue
+++ b/src/views/_sila/Processors/Dynamic/CpuTemp.vue
@@ -8,7 +8,7 @@
       <img src="@/assets/images/_sila/collapsed/temperature.svg" />
     </template>
     <page-section>
-      <b-row class="align-items-end p-2">
+      <!--      <b-row class="align-items-end p-2">
         <b-col xs="12" md="6" lg="3" class="pt-2">
           <b-form-group :label="$t('pageProcessors.labels.notNormal')">
             <b-form-input
@@ -36,7 +36,7 @@
             {{ $t('global.action.save') }}
           </b-button>
         </b-col>
-      </b-row>
+      </b-row>-->
       <chart
         type="processors"
         :time-scale="timeScale"
-- 
cgit v1.2.3

