From f12e602ab84f2a4ae28a064ed2058f57b9cf9bc3 Mon Sep 17 00:00:00 2001
From: Anna Tsyganova <ATSyganova@IBS.RU>
Date: Fri, 8 Jul 2022 11:32:33 +0300
Subject: Fix a little global components Issue: SILABMC-191

---
 .../SecurityAndAccess/UserManagement/UserManagement.vue      | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'src/views/_sila/SecurityAndAccess/UserManagement/UserManagement.vue')

diff --git a/src/views/_sila/SecurityAndAccess/UserManagement/UserManagement.vue b/src/views/_sila/SecurityAndAccess/UserManagement/UserManagement.vue
index c6c556c8..423ce4c1 100644
--- a/src/views/_sila/SecurityAndAccess/UserManagement/UserManagement.vue
+++ b/src/views/_sila/SecurityAndAccess/UserManagement/UserManagement.vue
@@ -121,18 +121,18 @@ import IconChevron from '@carbon/icons-vue/es/chevron--up/20';
 
 import ModalUser from './ModalUser';
 import ModalSettings from './ModalSettings';
-import PageTitle from '@/components/Global/PageTitle';
+import PageTitle from '@/components/_sila/Global/PageTitle';
 import TableRoles from './TableRoles';
-import TableToolbar from '@/components/Global/TableToolbar';
-import TableRowAction from '@/components/Global/TableRowAction';
+import TableToolbar from '@/components/_sila/Global/TableToolbar';
+import TableRowAction from '@/components/_sila/Global/TableRowAction';
 
 import BVTableSelectableMixin, {
   selectedRows,
   tableHeaderCheckboxModel,
   tableHeaderCheckboxIndeterminate,
-} from '@/components/Mixins/BVTableSelectableMixin';
-import BVToastMixin from '@/components/Mixins/BVToastMixin';
-import LoadingBarMixin from '@/components/Mixins/LoadingBarMixin';
+} from '@/components/_sila/Mixins/BVTableSelectableMixin';
+import BVToastMixin from '@/components/_sila/Mixins/BVToastMixin';
+import LoadingBarMixin from '@/components/_sila/Mixins/LoadingBarMixin';
 
 export default {
   name: 'UserManagement',
-- 
cgit v1.2.3

