<template>
  <b-container fluid="xl">
    <page-title />
    <page-section :section-title="$t('pagePci.title')">
      <b-table
        responsive="md"
        show-empty
        hover
        :items="items"
        :fields="fields"
        :empty-text="$t('global.table.emptyMessage')"
        :busy="isBusy"
      >
      </b-table>
    </page-section>
  </b-container>
</template>

<script>
import PageTitle from '@/components/_sila/Global/PageTitle';
import PageSection from '@/components/_sila/Global/PageSection';

import DataFormatterMixin from '@/components/_sila/Mixins/DataFormatterMixin';
import LoadingBarMixin from '@/components/_sila/Mixins/LoadingBarMixin';

export default {
  components: { PageTitle, PageSection },
  mixins: [DataFormatterMixin, LoadingBarMixin],
  data() {
    return {
      isBusy: true,
      fields: [
        {
          key: 'id',
          label: this.$t('pagePci.table.id'),
          formatter: this.dataFormatter,
          tdClass: 'text-nowrap',
        },
        {
          key: 'name',
          label: this.$t('pagePci.table.name'),
          formatter: this.dataFormatter,
        },
        {
          key: 'type',
          label: this.$t('pagePci.table.type'),
          formatter: this.dataFormatter,
        },
        {
          key: 'manufacturer',
          label: this.$t('pagePci.table.manufacturer'),
          formatter: this.dataFormatter,
        },
      ],
    };
  },

  computed: {
    items() {
      return this.$store.getters['pci/pciDevices'];
    },
  },

  created() {
    this.startLoader();
    this.$store.dispatch('pci/getDevices').finally(() => {
      this.endLoader();
      this.isBusy = false;
    });
  },
};
</script>
